\begin{quote}\footnotesize\begin{verbatim}
#-**************************************
#
#
# -*** UCL's default local entry ***- 
# -*** this is different for every PP site ***- 
# (lines folded for readability)
default:lpsap='"591"/Internet=bells',lmta="UK.AC.UCL.CS",lpass=" "
#
#
-*** NASA ***-
#
us-nasa:rmta="titan.arc.nasa.gov",
  rpsap='"591"/Internet=128.102.128.5'
#
# -*** UCL ***-
gb-ucl:rmta="UK.AC.UCL.CS",rpass=" ",
  rpsap='"591"/X121+23421920030080'
#
# -*** when pid is specified, the rpsap format below is used ***-
#
eg_site1:rmta="SiteName1",
  rpsap='"999"/Int-X25(80)=23421234005004+PID+03010100'
#
# -*** when more than one network address is specified ***-
# -*** note the network addresses are seperated by '|' ***-
#
eg_site2:rmta="SiteName2",
  rpsap='"400"/X121+23427351714799|X121+23428490013799'
#
# -*** when trynext is specified, the format below is used ***-
#
eg_site3:rmta="SiteName3",rpsap='"999"/X121+234212340050',
  trynext="eg_site2"
#
# 
au-manta:rmta="manta.cng.dit.csiro.au",rpass=" ",
  rpsap='"591"/Int-X25(80)=50523343000180+PID+03010100|Internet=128.250.1.100'
#
#
#
#-**************************************
\end{verbatim}\end{quote}
